\hypertarget{classcore_1_1_timer}{}\section{core\+:\+:Timer Class Reference}
\label{classcore_1_1_timer}\index{core\+::\+Timer@{core\+::\+Timer}}


{\ttfamily \#include $<$Timer.\+h$>$}



Inheritance diagram for core\+:\+:Timer\+:
\nopagebreak
\begin{figure}[H]
\begin{center}
\leavevmode
\includegraphics[width=248pt]{classcore_1_1_timer__inherit__graph}
\end{center}
\end{figure}


Collaboration diagram for core\+:\+:Timer\+:
\nopagebreak
\begin{figure}[H]
\begin{center}
\leavevmode
\includegraphics[width=302pt]{classcore_1_1_timer__coll__graph}
\end{center}
\end{figure}
\subsection*{Public Member Functions}
\begin{DoxyCompactItemize}
\item 
\mbox{\Hypertarget{classcore_1_1_timer_aa12f319bab9c7a350244c4d47fe59de9}\label{classcore_1_1_timer_aa12f319bab9c7a350244c4d47fe59de9}} 
{\bfseries Timer} (\hyperlink{classcore_1_1_e_poll}{E\+Poll} \&e\+Poll)
\item 
\mbox{\Hypertarget{classcore_1_1_timer_a6ba8de81f8e3b26fd132e29230646024}\label{classcore_1_1_timer_a6ba8de81f8e3b26fd132e29230646024}} 
{\bfseries Timer} (\hyperlink{classcore_1_1_e_poll}{E\+Poll} \&e\+Poll, double delay)
\item 
void \hyperlink{classcore_1_1_timer_ac0a642cdcb76b7f995137162050d3d0b}{set\+Timer} (double delay)
\item 
void \hyperlink{classcore_1_1_timer_a8e063f46e89dac04364871e909ab940a}{clear\+Timer} ()
\item 
double \hyperlink{classcore_1_1_timer_a0df7f1ffc05529b45d6e13713bbc0209}{get\+Elapsed} ()
\item 
\mbox{\Hypertarget{classcore_1_1_timer_afee1c871ce74e6b594bd6e64ad3cb576}\label{classcore_1_1_timer_afee1c871ce74e6b594bd6e64ad3cb576}} 
double {\bfseries get\+Epoch} ()
\end{DoxyCompactItemize}
\subsection*{Protected Member Functions}
\begin{DoxyCompactItemize}
\item 
virtual void \hyperlink{classcore_1_1_timer_ae51704ff08d985bbc30e3ff4c9b3c6ca}{on\+Timeout} ()=0
\end{DoxyCompactItemize}


\subsection{Detailed Description}
\hyperlink{classcore_1_1_timer}{Timer}

Set and trigger callback upon specified timeout.

The \hyperlink{classcore_1_1_timer}{Timer} is used to establish a timer using the timer socket interface. It cannot be instantiated directly but must be extended. 

\subsection{Member Function Documentation}
\mbox{\Hypertarget{classcore_1_1_timer_a8e063f46e89dac04364871e909ab940a}\label{classcore_1_1_timer_a8e063f46e89dac04364871e909ab940a}} 
\index{core\+::\+Timer@{core\+::\+Timer}!clear\+Timer@{clear\+Timer}}
\index{clear\+Timer@{clear\+Timer}!core\+::\+Timer@{core\+::\+Timer}}
\subsubsection{\texorpdfstring{clear\+Timer()}{clearTimer()}}
{\footnotesize\ttfamily void core\+::\+Timer\+::clear\+Timer (\begin{DoxyParamCaption}{ }\end{DoxyParamCaption})}

Use the \hyperlink{classcore_1_1_timer_a8e063f46e89dac04364871e909ab940a}{clear\+Timer()} to unset the timer and return the timer to an idle state. \mbox{\Hypertarget{classcore_1_1_timer_a0df7f1ffc05529b45d6e13713bbc0209}\label{classcore_1_1_timer_a0df7f1ffc05529b45d6e13713bbc0209}} 
\index{core\+::\+Timer@{core\+::\+Timer}!get\+Elapsed@{get\+Elapsed}}
\index{get\+Elapsed@{get\+Elapsed}!core\+::\+Timer@{core\+::\+Timer}}
\subsubsection{\texorpdfstring{get\+Elapsed()}{getElapsed()}}
{\footnotesize\ttfamily double core\+::\+Timer\+::get\+Elapsed (\begin{DoxyParamCaption}{ }\end{DoxyParamCaption})}

Use the \hyperlink{classcore_1_1_timer_a0df7f1ffc05529b45d6e13713bbc0209}{get\+Elapsed()} method to obtain the amount of time that has elapsed since the timer was set. \mbox{\Hypertarget{classcore_1_1_timer_ae51704ff08d985bbc30e3ff4c9b3c6ca}\label{classcore_1_1_timer_ae51704ff08d985bbc30e3ff4c9b3c6ca}} 
\index{core\+::\+Timer@{core\+::\+Timer}!on\+Timeout@{on\+Timeout}}
\index{on\+Timeout@{on\+Timeout}!core\+::\+Timer@{core\+::\+Timer}}
\subsubsection{\texorpdfstring{on\+Timeout()}{onTimeout()}}
{\footnotesize\ttfamily virtual void core\+::\+Timer\+::on\+Timeout (\begin{DoxyParamCaption}{ }\end{DoxyParamCaption})\hspace{0.3cm}{\ttfamily [protected]}, {\ttfamily [pure virtual]}}

This method is called when the time out occurs. \mbox{\Hypertarget{classcore_1_1_timer_ac0a642cdcb76b7f995137162050d3d0b}\label{classcore_1_1_timer_ac0a642cdcb76b7f995137162050d3d0b}} 
\index{core\+::\+Timer@{core\+::\+Timer}!set\+Timer@{set\+Timer}}
\index{set\+Timer@{set\+Timer}!core\+::\+Timer@{core\+::\+Timer}}
\subsubsection{\texorpdfstring{set\+Timer()}{setTimer()}}
{\footnotesize\ttfamily void core\+::\+Timer\+::set\+Timer (\begin{DoxyParamCaption}\item[{double}]{delay }\end{DoxyParamCaption})}

Use the \hyperlink{classcore_1_1_timer_ac0a642cdcb76b7f995137162050d3d0b}{set\+Timer()} method to set the time out value for timer. Setting the timer also starts the timer countdown. The \hyperlink{classcore_1_1_timer_a8e063f46e89dac04364871e909ab940a}{clear\+Timer()} method can be used to reset the timer without triggering the \hyperlink{classcore_1_1_timer_ae51704ff08d985bbc30e3ff4c9b3c6ca}{on\+Timeout()} callback.


\begin{DoxyParams}{Parameters}
{\em delay} & the amount of time in seconds to wait before trigering the on\+Timeout function. \\
\hline
\end{DoxyParams}


The documentation for this class was generated from the following files\+:\begin{DoxyCompactItemize}
\item 
Timer.\+h\item 
Timer.\+cpp\end{DoxyCompactItemize}
